\documentclass{article}
\usepackage{ulem}
\pagestyle{headings}
\begin{document}
\part{ Turck MMCache Troubleshooting}
If you are using Turck MMCache and, in IMP:

\begin{itemize}
\item{You cannot see any message bodies or attachments  \textsl{OR}}
\item{You only see the full text of the headers in the message body}
\end{itemize}
Here is an example image of the issue:\newline
Image: NI

(Also see http://marc.info/?l=imp\&m=108163709627707\&w=2\footnote{http://marc.info/?l=imp\&m=108163709627707\&w=2} for example symptoms)

Go here for instructions on how to fix your problem:\newline
http://marc.info/?l=imp\&m=108165035111663\&w=2\footnote{http://marc.info/?l=imp\&m=108165035111663\&w=2}

Make sure the cache is deleted everytime Apache is restarted:\newline
http://marc.info/?l=imp\&m=110841113507998\&w=2\footnote{http://marc.info/?l=imp\&m=110841113507998\&w=2}

After some testing I entered the following to my php.ini:\newline
mmcache.filter="!*/lib/Horde/MIME/Message.php*"


\noindent\rule{\textwidth}{1pt}
Turck MMCache seems to be dead. There's a fork called eAccelerator (http://eaccelerator.sourceforge.net/\footnote{http://eaccelerator.sourceforge.net/}). This problem should be fixed in the CVS version, but it is not yet fixed in version 0.9.3.

\end{document}
