\documentclass{article}
\usepackage{ulem}
\usepackage{graphicx}
\usepackage{hyperref}
\pagestyle{headings}
\begin{document}
\part{Turck MMCache Troubleshooting}
If you are using Turck MMCache and, in IMP:

\begin{itemize}
\item You cannot see any message bodies or attachments  \textit{OR}


\item You only see the full text of the headers in the message body<br />
Here is an example image of the issue:<br />
\includegraphics{http://bugs.horde.org/view.php?actionID=view\_file\&type=jpg\&file=bug.jpg\&ticket=1699}


\end{itemize}
(Also see <a href="http://marc.info/?l=imp\&amp;m=108163709627707\&amp;w=2">http://marc.info/?l=imp\textbackslash\{\}\&m=108163709627707\textbackslash\{\}\&w=2</a> for example symptoms)

Go here for instructions on how to fix your problem:<br />
<a href="http://marc.info/?l=imp\&amp;m=108165035111663\&amp;w=2">http://marc.info/?l=imp\textbackslash\{\}\&m=108165035111663\textbackslash\{\}\&w=2</a>

Make sure the cache is deleted everytime Apache is restarted:<br />
<a href="http://marc.info/?l=imp\&amp;m=110841113507998\&amp;w=2">http://marc.info/?l=imp\textbackslash\{\}\&m=110841113507998\textbackslash\{\}\&w=2</a>

After some testing I entered the following to my php.ini:<br />
mmcache.filter="!*/lib/Horde/MIME/Message.php*"


\noindent\rule{\textwidth}{1pt}
Turck MMCache seems to be dead. There's a fork called eAccelerator (<a href="http://eaccelerator.sourceforge.net/\">http://eaccelerator.sourceforge.net/\textbackslash\{\}</a>). This problem should be fixed in the CVS version, but it is not yet fixed in version 0.9.3.

\end{document}
