\documentclass{article}
\usepackage{ulem}
\usepackage{graphicx}
\usepackage{hyperref}
\pagestyle{headings}
\begin{document}
Generic target page.  You <a href="https://wiki.horde.org/SmashWordsTogether">SmashWordsTogether</a> to indicate a wiki page name.

\end{document}
