\documentclass{article}
\usepackage{ulem}
\pagestyle{headings}
\begin{document}
\tableofcontents

IMP Configurationconf.phpUser Capabilities and Constraints\$conf[user][select\_view]

\part{IMP Configuration}
\section{conf.php}
This is the file where all server-wide settings for IMP go. It is supposed to be generated through the web interface\footnote{http://example.com/index.php?page=Doc/Admin}.

\subsection{User Capabilities and Constraints}
\subsubsection{\$conf[user][select\_view]}
If DIMP and MIMP are installed, the IMP login page displays a drop down list that allows the user to pick the preferred webmail view. This decision is stored in a browser cookie, so that the selected view is selected by default the next time the user logs in.\newline
With the configuration setting \texttt{\$conf[user][select\_view]} you can disable the drop down list.

There is no setting to make one of the views the default for user that have \textbf{not} logged in and picked a view yet. You can achieve the same with adding the following lines to \texttt{config/conf.php} though:

\begin{verbatim}

if (!isset($_COOKIE['default_imp_view'])) {
    $_COOKIE['default_imp_view'] = 'dimp';
}
\end{verbatim}

\end{document}
